0 1 2 3 4 5 6 7 8 9 10 mass(det) 0 1 2 3 4 5 6 7 8 9 10 mass(gen)

MdetgenMC

Entries 999998 Mean x 4.029 Mean y 4.026 Std Dev x 0.8018 Std Dev y 0.7814

0 1 2 3 4 5 6 7 8 9 10 mass(gen)

0

2000

4000

6000

8000

10000

12000

TotalError

Entries 100

Mean 3.861

Std Dev 0.5247

0 1 2 3 4 5 6 7 8 9 10 mass(det) 0

500

1000

1500

2000

2500

3000

3500

FoldedBack

FoldedBack

Entries 502

Mean 3.034

Std Dev 1.647

0 1 2 3 4 5 6 7 8 9 10 mass(gen)

0.9

0.92

0.94

0.96

0.98

1 rho_I

rho_I

Entries 202

Mean 4.997

Std Dev 2.883

5− 4.9− 4.8− 4.7− 4.6− 4.5− 4.4− 4.3− 4.2− 4.1−

2.22

2.225

2.23

2.235

2.24

2.245

log(chi**2)%log(tau)

2.22 2.225 2.23 2.235 2.24 2.245 9.4

9.6

9.8

10

10.2

L curve