0 1 2 3 4 5 6 7 8 9 10 mass(det) 0 1 2 3 4 5 6 7 8 9 10 mass(gen)

MdetgenMC

Entries 999998 Mean x 4.029 Mean y 4.026 Std Dev x 0.8018 Std Dev y 0.7814

0 1 2 3 4 5 6 7 8 9 10 mass(gen)

0 2000

4000

6000

8000

10000

12000

14000

Unfolded

Entries 202 Mean 3.745 Std Dev 0.8377

0 1 2 3 4 5 6 7 8 9 10 0 500 1000

1500

2000

2500

3000

3500

4000

mass(det)_{FoldedBack}

Entries 502 Mean 3.044 Std Dev 1.646

mass(det)

0 1 2 3 4 5 6 7 8 9 10

0.82

0.84

0.86

0.88 0.9 0.92

0.94

0.96

0.98 1 mass

rho_I

Entries 202 Mean 4.978 Std Dev 2.859

4.3 − 4.2− 4.1− 4− 3.9− 3.8− 3.7− 3.6− 3.5− 3.4−

2.19

2.195

2.2

2.205

2.21

2.215

log(chi**2)%log(tau)

2.185 2.19 2.195 2.2 2.205 2.21 2.215 2.22 7.4

7.6

7.8

8

8.2

8.4

8.6

8.8 L curve