Average Beam Momentum [GeV/c^2]

140 145 150 155 160 165 170 175 180 185 190

HMC Estimate - Input Generation Value

-0.005

0

0.005

0.01

0.015

0.02

HMC Output (Input g=-0.2154) vs Average Beam Momentum

Chi2 / ndf = 6.373 / 6 p0 = 0.009799 +- 0.001133 p1 = 3.567e-05 +- 7.088e-0