[rad] ϕ 0 0.5 1 1.5 2 2.5 3 ϕ dN/d

0

50

100

150

200

250

300

350 h4 Entries 10421

Mean 1.441

RMS 0.7615

Underflow 0

Overflow 2

Integral 1.042e+04

ϕ and Charged Track in r- γ Angle between Minimum-Distance EMC Hits of ISR

distance l [cm]

0 20 40 60 80 100 120 140 160 180 200 dN/dl

0

100

200

300

400

500 h1

Entries 10421

Mean 116

RMS 52.98

Underflow 0

Overflow 0

Integral 1.042e+04

ϕ and Charged Track in r- γ Minimum Distance between EMC Hits of ISR

h1