0

200

400

600

800

1000

1200

minMassDiffEta

-1.5 -1 -0.5 0 0.5 ePhotEta

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

ePhotEta:minMassDiffEta {minDistCha_lab_reco<10000&&minDistNeut_lab_reco<10000&&matchTruthPid!=0&&egamma_CM_reco>=3.3&&egamma_CM_reco<=4.1&&abs(minMassDiffPi0)<2&&motherTruth==10022}